懸山 xúanshān
edition published: 2021-03-24
language: en; zh-latn-pinyin; zh-latn-pinyin-nt; zh-latn-wadegile; zh-Hant; zh-Hans
availability: Distributed under a Creative Commons Attribution 3.0 Unported License. (http://creativecommons.org/licenses/by/3.0/)

xuanshan 懸山 悬山 xúanshān hsüan-shan overhanging gable roof[^1] [不厦兩頭 bù shàliǎngtóu] [...] 370

[...] 86
[...] 370

https://architecturasinica.org/keyword/k000146

[^1: A term commonly used in the Qing dynasty for a two-sloped, gable roof which extends beyond the wall plane on the gable ends (Guo 2002, 86). This type can also be called a xuanshanding 懸山頂, where ding 頂 means roof (Fu 2017, 370).

一種兩坡，並且在山面挑出的屋頂形式。]