殿 diàn
edition published: 2018-03-21-04:00
language: en; zh-latn-pinyin; zh-latn-pinyin-nt; zh-latn-wadegile; zh-Hant; zh-Hans
availability: Distributed under a Creative Commons Attribution 3.0 Unported License. (http://creativecommons.org/licenses/by/3.0/)

dian 殿 殿 diàn tien hall royal hall https://architecturasinica.org/keyword/k000062[^1][^2] [...] 86

[...] 86
[...] 1.3b
[...] 5
[...] 100-107

[^1: Architecturally speaking, dian usually means a large and high-ranking hall (tang 堂) or throne-hall (Li 李 2009, 1.3b; Kroll 2015, 86), although term can also refer to the "rearguard" of a palace (Kroll 2015, 86). From as early as the Northern and Southern dynasties, dian was used as a specific term for a main audience hall within the imperial palace. It also refers to the main building in Buddhist monasteries. For example, the Luoyang qielan ji records that Yongning Monastery 永寧寺 held a Buddha “dian” north of the “futu”, which looked like Taiji “dian” (futu bei you Fo dian yi suo, xingru Taijidian 浮圖北有佛殿一所，形如太極殿). Taijidian was the main building in the imperial palace in Luoyang (Zhou and Yang 2010, 5). The use of the term dian for buildings housing both the Buddha and the emperor suggests that the emperor and the Buddha were equated spatially and thus hierarchically (Zhuge and Xue 2021).

殿本意为高大房屋，《營造法式》即轉引《蒼頡篇》釋殿為大堂(李 2009, 1.3b)。大約從魏晋南北朝開始，殿漸漸專指帝王宮殿；也用於指佛寺主要建築物，如《洛陽伽藍記》永寧寺“浮圖北有佛殿一所，形如太極殿”(周和杨 2010, 5)，暗示了佛的等级可与帝王相当 (諸葛和薛 2021)。]

[^2: diàntáng 殿堂

tīngtáng 廳堂

táng 堂]