Jin Shrines, Shrine to the Eastern Peak, great hall東嶽祠大殿
edition published: 2020-10-22-04:00
language: en; zh-latn-pinyin; zh-Hant; zh-Hans; zh-latn-wadegile
availability: Distributed under a Creative Commons Attribution 3.0 Unported License. (http://creativecommons.org/licenses/by/3.0/)

Shrine to the Eastern Peak, great hall; 東嶽祠大殿; 东岳祠大殿; Dōngyuècí dàdiàn; Tung-yüeh-tz'u ta-tien; 東嶽廟大殿; 东岳庙大殿; Temple to the Eastern Peak, great hall; Dōngyuèmiào dàdiàn; 泰山廟大殿; Temple to the Mount Tai, great hall; Taishanmiao dàdiàn
identifier: https://architecturasinica.org/place/000048i3
Date: 1342-1877
Dynasty: Yuan-Qing 1279-1912
Located at the north end of the small complex’s central axis, the great hall of the Shrine to the Eastern Peak is 12 x 9.9 meters and three bays wide. It is crowned with an overhanging gable (xuanshan 懸山) roof. The god of the Eastern Peak is worshiped inside the hall (Liu 1986, 29; Liu et al. 2015, vol. 7, 1).
location: 37.708685 112.435896
location: [location determined with Google Earth 2023-09-15]
Type: hall, diàn, 殿, 殿
[...] vol. 7, 1
[...] 190
12